╔═════════════════════════════════════════════════════════════════════════════╗
║                         TEXTEDIT Program Help Screen                        ║
╟────────┬────────────────────────────────────────────────────────────────────╢
║        │(Arrows) Cursor Position   [PgUp] Up 24 Lines  [PgDn] Down 24 Lines ║
║  Edit  │ [Home] Start of line     [End] End of line     [Ctrl-Y] Blank Line ║
║  Keys  │ [Ctrl-Right] Next Word   [Ctrl-Left] Prev. Word  [Alt-D] Del. Line ║
║        │ [Alt-M] Mark Line   [Alt-C] Copy Marked Lines   [Alt-U] Unmark All ║
║        │ [Alt-P] Esc Character    [Alt-N] Form Feed     [Ins] Toggle Insert ║
╟────────┼────────────────────────────────────────────────────────────────────╢
║ Box +  │         F1╔   F2═   F3╗   F4║   F5╚   F6╝   F7╠   F8╣   F9╦   F10╩ ║
║ Line   │  Alt +  F1┌   F2─   F3┐   F4│   F5└   F6┘   F7├   F8┤   F9┬   F10┴ ║
║ Char's │          [Alt-White Plus Key] ╬       [Alt-White Asterick] ┼       ║
╟────────┼─────────────────────┬──────────────────────────────────────────────╢
║ Other  │ [Alt-H] Help Screen │ [Alt-A] ASCII Chart ([Alt+CODE] = Character) ║
╟────────┴─────────────────────┴──────────────────────────────────────────────╢
║ To insert a graphics screen in printed output, type two tilde ~ characters  ║
║ at the beginning of a line, followed immediately by the name of the graphic ║
║ file.  Two parameters must be included immediately after the file name. The ║
║ first parameter defines the type of printer (L for 9 pin or H for 24 pin).  ║
║ The second parameter defines the orientation and size of the graphic image  ║
║ (P for portrait, O for large portrait, or L for landscape).  Example:       ║
║ ~~USA.PIK/L/P Prints USA.PIK in 9 pin mode (/L) and in portrait aspect(/P). ║
╚═════════════════════════════════════════════════════════════════════════════╝
